--application/shared_components/user_interface/themes/national_grid
begin
wwv_flow_api.create_theme (
  p_id =>24750938041526809 + wwv_flow_api.g_id_offset,
  p_flow_id =>wwv_flow.g_flow_id,
  p_theme_id  => 101,
  p_theme_name=>'National Grid',
  p_default_page_template=>24734011047526756 + wwv_flow_api.g_id_offset,
  p_error_template=>24734616867526758 + wwv_flow_api.g_id_offset,
  p_printer_friendly_template=>24735530196526758 + wwv_flow_api.g_id_offset,
  p_breadcrumb_display_point=>'REGION_POSITION_01',
  p_sidebar_display_point=>'REGION_POSITION_02',
  p_login_template=>24733840230526723 + wwv_flow_api.g_id_offset,
  p_default_button_template=>24749440874526790 + wwv_flow_api.g_id_offset,
  p_default_region_template=>24740611526526770 + wwv_flow_api.g_id_offset,
  p_default_chart_template =>24737941385526765 + wwv_flow_api.g_id_offset,
  p_default_form_template  =>24738214051526765 + wwv_flow_api.g_id_offset,
  p_default_reportr_template   =>24740611526526770 + wwv_flow_api.g_id_offset,
  p_default_tabform_template  =>24740611526526770 + wwv_flow_api.g_id_offset,
  p_default_wizard_template   =>24742135446526770 + wwv_flow_api.g_id_offset,
  p_default_menur_template    =>24737010408526765 + wwv_flow_api.g_id_offset,
  p_default_listr_template    =>24740611526526770 + wwv_flow_api.g_id_offset,
  p_default_report_template   =>24743617611526775 + wwv_flow_api.g_id_offset,
  p_default_label_template    =>24749138532526789 + wwv_flow_api.g_id_offset,
  p_default_menu_template     =>24750232156526795 + wwv_flow_api.g_id_offset,
  p_default_calendar_template =>24750440422526800 + wwv_flow_api.g_id_offset,
  p_default_list_template     =>24748312327526783 + wwv_flow_api.g_id_offset,
  p_default_option_label      =>24749138532526789 + wwv_flow_api.g_id_offset,
  p_default_required_label    =>24749318534526790 + wwv_flow_api.g_id_offset);
end;
/
 
prompt  ...build options used by application 155
--
 
begin
 
null;
 
end;
/

