REM $Id: applylog.sql 3443 2008-02-01 15:56:18Z hardya $
set echo on
spool activatestandby.log
connect &&user/&&password as sysdba
alter database activate standby;
shutdown immediate;
startup mount;
alter database open;
spool off;
exit
